Erratum: Storage management and caching in PAST, a large-scale, persistent peer-to-peer storage utility

Antony Rowstron

Microsoft Research St. George House, 1 Guildhall Street Cambridge, CB2 3NH, United Kingdom.

antr@microsoft.com

Peter Druschel

Rice University 6100 Main Street, MS 132 Houston, TX 77005-1892, USA.

druschel@cs.rice.edu

In the published paper there were three errors: Table 3 and Figures 2 and 3. In this erratum we present the correct table and figures. The results still support the choice of tpri and t_{div} that were used in the paper.

tpri Succeed Fail File Replica Util. divers. divers.

0.5 88.02% 11.98% 4.43% 18.80% 99.7% 0.2 96.57% 3.43% 4.41% 18.13% 99.4% 0.1 99.34% 0.66% 3.47% 16.10% 98.2% 0.05 99.73% 0.27% 2.17% 12.86% 97.4%

Table 3: Insertion statistics and utilization of PAST as tpri is varied and t_{div} = 0.05.

Figure 2: Cumulative failure ratio versus storage utilization achieved by varying the tpri parameter and t_{div} = 0.05.

Figure 3: Cumulative failure ratio versus storage utilization achieved by varying the t_{div} parameter and tpri = 0.1.